htemp Entries 486290 Mean 581.4 RMS 411.3

Adc1

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 2000

4000

6000

8000

10000

12000

14000

Adc1 {Adc3>0&&Adc1>0}